Mist Of Gold

Mist Of Gold

Mist Of Gold, The name “Golden Gate” holds an important connotation in the Bay Area as a reference point for the region, and is attached to the bridge that spans the strait, a large park in San Francisco, and other local establishments. The Golden Gate Bridge is a suspension bridge spanning the Golden Gate, the opening of the San Francisco Bay onto the Pacific Ocean. The Golden Gate Bridge had the longest suspension bridge span in the world when it was completed in 1937 and has become an internationally recognized symbol of San Francisco and California.