The Largest House of Cards

The Largest House of Cards

Tireless American Bryan Berg spent 44 days out, to lay out playing cards the biggest house of cards - the layout of the largest casinos in Macau, China. biggest "house of cards" was built in the Macao Special Administrative Region  in China,which is also considered the largest hotel complex in the world.An architect by training, Berg did not use the card to create a record or tape constructions, no glue.Copy of the Venice Card Casino Macau is 10.6 meters in length, 3 meters in height and weighs 272 kg.For the manufacture of models have been used 218,792 playing cards or a deck 4051.